    Login Status

    You can use this menu choice to allow or disallow logins. 

    The Allow Logins menu choice lets users gain access to the
    system.

    The Disallow Logins menu choice stops any users from gaining
    access to the system.  This only works on systems which recognize
    the /etc/nologin mechanism.  Typically you use this option during
    system maintenance or when a large job is running which requires
    most of the CPU's resources.

    When you select the desired menu item, Enlighten will prompt
    for confirmation, if needed. For example, if you highlighted Allow
    Logins and no confirmation appeared, you are already allowing
    logins.  Otherwise a pop-up window will appear and you can click OK
    to execute the desired action.

    NOTE: The only way to remove a temporary lockout from the system 
    is to go back to the User menu and choose Allow Logins. Or you can 
    reboot the system.
